X-Git-Url: https://git.ao2.it/libam7xxx.git/blobdiff_plain/1b664da3a5ddbcc641a3694150ff2fb4167f3491..35ea676b59ee516be9cd544a162dd89f830e6c24:/README.asciidoc?ds=inline

diff --git a/README.asciidoc b/README.asciidoc
index 011ad9f..488dc10 100644
--- a/README.asciidoc
+++ b/README.asciidoc
@@ -24,7 +24,7 @@ is at: http://wenku.baidu.com/view/543c8b4d852458fb770b56ee.html
 
 == Supported devices
 
-The devices supported by libam7xxx use USB bulk trasfers and a simple packet
+The devices supported by libam7xxx use USB bulk transfers and a simple packet
 based protocol to exchange data and commands to and from a host system and the
 AM7XXX chip.
 
