X-Git-Url: https://git.ao2.it/libam7xxx.git/blobdiff_plain/5f35f6df5123a6e7ad49fa6bfc3686b78fde015a..ff1b548c9ae29b22e42c232710eebf20440dbed8:/README.asciidoc?ds=inline

diff --git a/README.asciidoc b/README.asciidoc
index 26ca6ea..0d878bc 100644
--- a/README.asciidoc
+++ b/README.asciidoc
@@ -46,7 +46,7 @@ manually with the command:
 
 Examples of devices based on AM7XXX are:
 
-  - Acer Series C pico projectors (C20 C110 C112 C120):
+  - Acer Series C pico projectors (C20 C110 C112):
       * http://www.acer.it/ac/it/IT/content/models/projector-c
       * http://support.acer.com/product/default.aspx?modelId=3888
     
