X-Git-Url: https://git.ao2.it/libam7xxx.git/blobdiff_plain/6d8691adaf1b7f1ec3f443ebb5cf494f5981b235..8f7b53699838c5d9895eeb8995bb74b38a5f733e:/HACKING.asciidoc

diff --git a/HACKING.asciidoc b/HACKING.asciidoc
index 5b2937d..cd9486d 100644
--- a/HACKING.asciidoc
+++ b/HACKING.asciidoc
@@ -22,3 +22,10 @@ can run:
   $ cmake ../ -DCMAKE_C_COMPILER=cgcc
   $ make
 
+=== Valgrind
+
+You can run the test program under the http://valgrind.org/[valgrind]
+dynamic analyzer by using a command like:
+
+  $ valgrind --leak-check=full --show-reachable=yes --track-origins=yes \
+    ./bin/picoproj -W 800 -H 480 -f my_image.jpg
