X-Git-Url: https://git.ao2.it/libam7xxx.git/blobdiff_plain/6fd589183522c616e244927fa09f6e2fa9bcd523..057fee46c1b01b10b70bd1f193f35850111b60de:/README.asciidoc

diff --git a/README.asciidoc b/README.asciidoc
index 3b277f9..1b65aff 100644
--- a/README.asciidoc
+++ b/README.asciidoc
@@ -89,6 +89,9 @@ All the needed files need to be in the same location:
     be built by following the instructions in the HACKING.asciidoc document
     from libam7xxx.
 
+  - 'am7xxx-play.exe' and the '.dll' files from the 'usr/bin/' dir in libav-win32:
+    http://win32.libav.org/win32/libav-win32-20120521.7z
+
 In order to use the device on MS Windows the WinUSB drivers must be installed
 for both the mass storage device and the display device:
 
@@ -105,4 +108,4 @@ for both the mass storage device and the display device:
   - When the new (display) device shows up, run Zadig and install the +WinUSB+
     driver for it too.
 
-Now it is possible to run 'picoproj.exe' on Windows.
+Now it is possible to run 'picoproj.exe' or 'am7xxx-play.exe' on Windows.
