X-Git-Url: https://git.ao2.it/libam7xxx.git/blobdiff_plain/ad533681e384694d1b680d793ce00eab9f2bb6f2..62489117acb91236f2266c04231dfcd755255d96:/README.asciidoc?ds=inline

diff --git a/README.asciidoc b/README.asciidoc
index ef981d4..ffa2e5d 100644
--- a/README.asciidoc
+++ b/README.asciidoc
@@ -44,8 +44,8 @@ manually with the command:
    --default-product 0x1101 \
    --message-content 55534243087052890000000000000cff020000000000000000000000000000
 
-Alternatively, on systems where libusb works but 'usb_mode_switch' is not
-easily available, the switch can be performed using the 'am7xxx_mode_switch'
+Alternatively, on systems where libusb works but 'usb-modeswitch' is not
+easily available, the switch can be performed using the 'am7xxx-modeswitch'
 example program from libam7xxx.
 
 Examples of devices based on AM7XXX are:
@@ -67,7 +67,7 @@ Examples of devices based on AM7XXX are:
 
   - Royaltek PJU-2100:
       * http://www.royaltek.com/index.php/pju-2100-pico-projector
-  
+
   - Aiptek PocketCinema T25:
       * http://www.aiptek.eu/index.php/en/products/pico-projectors/pocketcinema-t25
 
@@ -85,18 +85,19 @@ this needs still needs to be verified.
 
 == Testing libam7xxx on MS Windows
 
-All the needed files need to be in the same location:
-  
-  - 'libusb-1.0.dll' from http://sourceforge.net/projects/libusbx/files/releases/1.0.11/Windows/libusbx-1.0.11-win.7z
+All the needed files below must be in the same location:
+
+  - 'MinGW32/dll/libusb-1.0.dll' from
+    http://download.sourceforge.net/project/libusb/libusb-1.0/libusb-1.0.18/libusb-1.0.18-win.7z
 
   - 'libssp-0.dll' from MinGW;
 
-  - 'am7xxx_mode_switch.exe', 'libam7xxx.dll' and 'picoproj.exe' which can all
-    be built by following the instructions in the HACKING.asciidoc document
-    from libam7xxx.
+  - all the '*.dll' files from the 'win32/usr/bin/' directory in
+    http://win32.libav.org/releases/libav-9.13-win32.7z
 
-  - 'am7xxx-play.exe' and the '.dll' files from the 'usr/bin/' dir in libav-win32:
-    http://win32.libav.org/win32/libav-win32-20120521.7z
+  - 'am7xxx-modeswitch.exe', 'am7xxx-play.exe', 'libam7xxx.dll' and
+    'picoproj.exe' which can all be built by following the instructions in the
+    HACKING.asciidoc document from libam7xxx.
 
 In order to use the device on MS Windows the WinUSB drivers must be installed
 for both the mass storage device and the display device:
@@ -109,7 +110,7 @@ for both the mass storage device and the display device:
     from now on the virtual CD-ROM can't be accessed anymore until the
     +USBSTOR+ Driver is restored.
 
-  - Run 'am7xxx_mode_switch.exe'
+  - Run 'am7xxx-modeswitch.exe'
 
   - When the new (display) device shows up, run Zadig and install the +WinUSB+
     driver for it too.
