X-Git-Url: https://git.ao2.it/libam7xxx.git/blobdiff_plain/b4dca6755f815cccdf3dc0ad1d792c42c08194ba..ca9d15b4f083d6b7f8257550f0a43839c3e052d9:/README.asciidoc

diff --git a/README.asciidoc b/README.asciidoc
index a4299cf..839a19e 100644
--- a/README.asciidoc
+++ b/README.asciidoc
@@ -67,7 +67,7 @@ Examples of devices based on AM7XXX are:
 
   - Royaltek PJU-2100:
       * http://www.royaltek.com/index.php/pju-2100-pico-projector
-  
+
   - Aiptek PocketCinema T25:
       * http://www.aiptek.eu/index.php/en/products/pico-projectors/pocketcinema-t25
 
@@ -86,14 +86,15 @@ this needs still needs to be verified.
 == Testing libam7xxx on MS Windows
 
 All the needed files below must be in the same location:
-  
+
   - 'MinGW32/dll/libusb-1.0.dll' from
-    http://download.sourceforge.net/project/libusb/libusb-1.0/libusb-1.0.18/libusb-1.0.18-win.7z
+    https://github.com/libusb/libusb/releases/download/v1.0.21/libusb-1.0.21.7z
 
   - 'libssp-0.dll' from MinGW;
 
-  - all the '*.dll' files from the 'win32/usr/bin/' directory in
-    http://win32.libav.org/releases/libav-9.13-win32.7z
+  - all the '*.dll' files in the 'bin/' directory from
+    https://ffmpeg.zeranoe.com/builds/win32/shared/ffmpeg-3.4.2-win32-shared.zip
+    
 
   - 'am7xxx-modeswitch.exe', 'am7xxx-play.exe', 'libam7xxx.dll' and
     'picoproj.exe' which can all be built by following the instructions in the
