X-Git-Url: https://git.ao2.it/libam7xxx.git/blobdiff_plain/ec30ccd48eef0583125ecee4c93712c64af2b2cd..80417f30dc0d1ff825d887032507511be4dcc11b:/README.asciidoc?ds=inline

diff --git a/README.asciidoc b/README.asciidoc
index dff227d..ffa2e5d 100644
--- a/README.asciidoc
+++ b/README.asciidoc
@@ -8,9 +8,12 @@ non-Windows Operating Systems like GNU/Linux or Android/Linux just to name
 a few, and on non-PC platforms like for instance mobile phones, tablets or
 game consoles.
 
-The first driver supporting these devices was acerc11xdrv from Reto Schneider:
+The first driver supporting these devices was _acerc11xdrv_ from Reto Schneider:
 https://github.com/rettichschnidi/acerc11xdrv
 
+Another project with the same purpose is _acerc110_ from Thomas Baquet:
+https://github.com/lordblackfox/acerc110
+
 == AM7XXX
 
 An overview of some AM7XXX chips (AM7211A AM7212 AM7212P AM7318 AM7213D
@@ -21,37 +24,53 @@ is at: http://wenku.baidu.com/view/543c8b4d852458fb770b56ee.html
 
 == Supported devices
 
-The devices supported by libam7xxx use USB bulk trasfers and a simple packet
+The devices supported by libam7xxx use USB bulk transfers and a simple packet
 based protocol to exchange data and commands to and from a host system and the
 AM7XXX chip.
 
-Those with USB VendorID +1de1+ are devices based on Actions Micro/Action Media
-designs, usually having two modes:
+Devices based on Actions Micro/Action Media designs generally use the USB
+VendorID +1de1+, and they can have two operational modes:
 
- - USB Mass Storage mode (ProductID: +1101+)
- - Generic bulk data transfer mode (ProductID: +c101+)
+ - USB Mass Storage mode (e.g. ProductID: +1101+)
+ - Generic bulk data transfer mode, or Display mode (e.g. ProductID: +c101+)
 
-The mode can be switched with the command:
+On recent GNU/Linux systems the switch from Mass Storage mode to Display mode
+is performed automatically by
+http://www.draisberghof.de/usb_modeswitch/[USB_ModeSwitch], or can be done
+manually with the command:
 
  $ sudo usb_modeswitch \
    --default-vendor 0x1de1 \
    --default-product 0x1101 \
    --message-content 55534243087052890000000000000cff020000000000000000000000000000
 
+Alternatively, on systems where libusb works but 'usb-modeswitch' is not
+easily available, the switch can be performed using the 'am7xxx-modeswitch'
+example program from libam7xxx.
+
 Examples of devices based on AM7XXX are:
 
-  - Acer Series C pico projectors (C20 C110 C112 C120):
+  - Acer Series C pico projectors (C20, C110, C112):
       * http://www.acer.it/ac/it/IT/content/models/projector-c
       * http://support.acer.com/product/default.aspx?modelId=3888
-    
+
   - Philips/SagemCom PicoPix projectors (PPX 1020, PPX 1230, PPX 1430, PPX
-    1630):
+    1630, PPX 2055, PPX 2330):
       * http://www.philips.co.uk/c/pocket-projector/179840/cat/
       * http://www.sagemcom.com/EN/products/image-sound/pico-video-projectors.html
 
   - CEL-TEC MP-01:
       * http://www.kabelmanie.cz/miniprojektor-cel-tec-mp-01/
 
+  - Top-Height/TEC PP700
+      * http://www.ishopiwin.com/en/appliances-electronics/electronics/projectors/pico-projector-pp-700.html
+
+  - Royaltek PJU-2100:
+      * http://www.royaltek.com/index.php/pju-2100-pico-projector
+
+  - Aiptek PocketCinema T25:
+      * http://www.aiptek.eu/index.php/en/products/pico-projectors/pocketcinema-t25
+
   - Other unbranded projectors:
       * http://www.dealextreme.com/p/portable-home-office-mini-usb-2-0-lcos-projector-16-9-45019
 
@@ -63,3 +82,37 @@ Examples of devices based on AM7XXX are:
 Maybe other devices reported as supporting "Display over USB (DoUSB)" like
 Acer K330 or some Optoma projectors could be used with this library, but
 this needs still needs to be verified.
+
+== Testing libam7xxx on MS Windows
+
+All the needed files below must be in the same location:
+
+  - 'MinGW32/dll/libusb-1.0.dll' from
+    http://download.sourceforge.net/project/libusb/libusb-1.0/libusb-1.0.18/libusb-1.0.18-win.7z
+
+  - 'libssp-0.dll' from MinGW;
+
+  - all the '*.dll' files from the 'win32/usr/bin/' directory in
+    http://win32.libav.org/releases/libav-9.13-win32.7z
+
+  - 'am7xxx-modeswitch.exe', 'am7xxx-play.exe', 'libam7xxx.dll' and
+    'picoproj.exe' which can all be built by following the instructions in the
+    HACKING.asciidoc document from libam7xxx.
+
+In order to use the device on MS Windows the WinUSB drivers must be installed
+for both the mass storage device and the display device:
+
+  - Download http://sourceforge.net/projects/libwdi/files/zadig/[Zadig], it is
+    a tool to install and replace USB devices filter drivers on MS Windows.
+
+  - From Zadig, select the USB Mass Storage Device relative to the projector
+    and replace the +USBSTOR+ driver with the +WinUSB+ one; keep in mind that
+    from now on the virtual CD-ROM can't be accessed anymore until the
+    +USBSTOR+ Driver is restored.
+
+  - Run 'am7xxx-modeswitch.exe'
+
+  - When the new (display) device shows up, run Zadig and install the +WinUSB+
+    driver for it too.
+
+Now it is possible to run 'picoproj.exe' or 'am7xxx-play.exe' on Windows.
