X-Git-Url: https://git.ao2.it/libam7xxx.git/blobdiff_plain/f2694ace893656d1629dd8dc33659e59b32f2d16..c78aecad840a537d5a1359a6118ca6c5cbd76010:/HACKING.asciidoc?ds=inline

diff --git a/HACKING.asciidoc b/HACKING.asciidoc
index a6595fe..a59c4af 100644
--- a/HACKING.asciidoc
+++ b/HACKING.asciidoc
@@ -81,3 +81,8 @@ dynamic analyzer by using a command like:
 
   $ valgrind --leak-check=full --show-reachable=yes --track-origins=yes \
     ./bin/picoproj -W 800 -H 480 -f my_image.jpg
+
+or, for am7xxx-play:
+
+  $ valgrind --leak-check=full --show-reachable=yes --track-origins=yes \
+    ./bin/am7xxx-play -f x11grab -i :0
