WINFREED(1)
===========
:doctype: manpage


NAME
----
winfreed - download a selection of Free Software for MS Windows


SYNOPSIS
--------
*winfreed* <'COMMAND'>


DESCRIPTION
-----------
The winfreed(1) command allows to download a selection of Free Software you 
can install on MS Windows.


COMMANDS
--------

*show*::
    Show info about all the available packages

*download*::
   Download all the packages


TODO Add command arguments like in "download <package>"


EXIT STATUS
-----------
*0*::
    Success

*1*::
    Failure (syntax or usage error; configuration error; document
    processing failure; unexpected error).


AUTHOR
------
WinFreed was originally written by Antonio Ospite.


RESOURCES
---------
Main web site: <http://git.ao2.it/winfreed/>


COPYING
-------
Copyright \(C) 2011  Antonio Ospite. Free use of this software is
granted under the terms of the GNU General Public License v3 (GPLv3).
